const Workflow = () => {
  return (
    <>
      <section className="workflow__area-6">
        <div className="container g-0 line pb-130">
          <div className="line-3"></div>
          <div className="workflow__wrapper-6">
            <div className="row">
              <div className="col-xxl-3 col-xl-3 col-lg-3 col-md-3">
                <div className="workflow__slide-6">
                  <h6 className="workflow__title-6">
                    Strategic <br />
                    Planning
                  </h6>
                  <p>
                    We focus on creating a custom strategy for your healthcare platform, aligning with your organization’s goals. Our approach ensures a seamless rollout, maximizing patient engagement and operational efficiency.
                  </p>
                </div>
              </div>

              <div className="col-xxl-3 col-xl-3 col-lg-3 col-md-3">
                <div className="workflow__slide-6">
                  <h6 className="workflow__title-6">
                    Platform <br />
                    Customization
                  </h6>
                  <p>
                    Our team customizes the healthcare platform to fit your specific needs, from patient management to telehealth services, creating an intuitive experience for both providers and patients.
                  </p>
                </div>
              </div>

              <div className="col-xxl-3 col-xl-3 col-lg-3 col-md-3">
                <div className="workflow__slide-6">
                  <h6 className="workflow__title-6">
                    Seamless <br />
                    Integration
                  </h6>
                  <p>
                    Our platform integrates seamlessly with existing Electronic Health Record (EHR) systems and other healthcare tools, reducing operational friction and enhancing the overall user experience.
                  </p>
                </div>
              </div>

              <div className="col-xxl-3 col-xl-3 col-lg-3 col-md-3">
                <div className="workflow__slide-6">
                  <h6 className="workflow__title-6">
                    User Testing <br />
                    & Feedback
                  </h6>
                  <p>
                    We conduct thorough testing to ensure the platform meets healthcare standards. Comprehensive feedback from providers and patients helps us continually refine the platform for optimal performance and usability.
                  </p>
                </div>
              </div>
            </div>
          </div>
        </div>
      </section>
    </>
  );
};

export default Workflow;
